)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

2v

0.01 −

0

0.01

0.02

0.03

0.04

Data Fit Event mixing

= 5.02 TeV NNs ALICE Pb-Pb 0-50%

<4.0 y 2.5< c<12 GeV/_Tp0<

)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

2vΔ

0.005 − 0 0.005

0.01 Data - Fit Data - Event mixing